Irradiation Test 12/13/01 - 3/21/02

I d d v s D o s e

4 0 0

4 5 0

5 0 0

5 5 0

6 0 0

6 5 0

7 0 0

7 5 0

8 0 0

8 5 0

9 0 0

9 5 0

1 0 0 0

0 . 0 0 . 5 1 . 0 1 . 5 2 . 0 2 . 5 3 . 0 3 . 5 4 . 0 4 . 5 5 . 0 5 . 5 6 . 0 6 . 5 7 . 0 7 . 5 8 . 0 8 . 5 9 . 0 9 . 5 1 0 . 0 1 0 . 5 1 1 . 0 1 1 . 5

D O S E ( M R a d )

Idd (mA)